
  Syntax        %FLOATING% &m&%.%&n&

  Purpose       Forces AMP to display all numerical output in floating
                point form.  &m& is the total number of places to use to
                display the number including sign and decimal point.  &n&
                is the number of digits to display after the decimal point.
                If a number is too large to fit the format then it is 
                displayed in scientific notation.

  Abbreviation          FLOAT for FLOATING

  %Example%

  þFLOATING 10.2

